1 1.5 2 2.5 3 3.5 4 4.5 5 5.5 6 Indice

10^{-16}

10^{-14}

10^{-12}

10^{-10}

10^{-8}

10^{-6}

10^{-4}

10^{-2}

10^0

Errore assoluto

Errori assoluti (metodo di Newton)